% This is the ``frame'' for the CDF summary output
\documentclass[11pt,letterpaper,twoside]{article}
%https://tex.stackexchange.com/questions/5035/paragraph-style-how-to-force-line-break-paragraph-make-paragraph-a-he
\makeatletter
\renewcommand\paragraph{%
  \@startsection{paragraph}{4}{0mm}%
                {-\baselineskip}%
                {.5\baselineskip}%
                {\normalfont\normalsize\bfseries}}
\makeatother
%http://tex.stackexchange.com/questions/664/why-should-i-use-usepackaget1fontenc
%http://tex.stackexchange.com/questions/2369/why-do-the-less-than-symbol-and-the-greater-than-symbol-appear-wrong-as
\usepackage[T1]{fontenc}
\usepackage{textcomp}
\usepackage{fancyhdr}
\usepackage{fullpage}
\usepackage[colorlinks=true, urlcolor=blue, pdfborder={0 0 0}, bookmarks=true]{hyperref}
\usepackage{wasysym}
\usepackage{xspace}
\usepackage{enumitem}
\newcommand{\thedate}{03 July 2019}\newcommand{\ISOIS}{IS{\astrosun}IS\xspace}
\newcommand{\thetitle}{\ISOIS CDF summary}
\pagestyle{fancy}
\fancyhf{}
\fancyhead[CE,CO]{\thetitle}
\fancyfoot[CE,CO]{\thedate}
\fancyfoot[RE,LO]{\leftmark}
\fancyfoot[LE,RO]{\thepage}
\renewcommand{\headrulewidth}{0pt}
\setlist{nolistsep}
\setlength{\parindent}{0pt}
\setcounter{secnumdepth}{4}
\setcounter{tocdepth}{3}
\newcommand{\mailto}[1]{\href{mailto:#1}{#1}} %mailto link
\setlength{\headheight}{12pt}
\setlength{\headsep}{12pt}
\raggedbottom
\begin{document}
\title{\thetitle}
\date{\thedate}
\maketitle
\clearpage
\tableofcontents
\clearpage
\section{Data file summaries}
\input{cdf_summary_varlist}
\input{cdf_summary}

\clearpage
\end{document}
